\section{rtp\+\_\+x\+\_\+hdr Struct Reference}
\label{structrtp__x__hdr}\index{rtp\+\_\+x\+\_\+hdr@{rtp\+\_\+x\+\_\+hdr}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structrtp__x__hdr_ac7010901031514e7bd2db3f7b0f66fab}} 
uint16\+\_\+t {\bfseries by\+\_\+profile}
\item 
\mbox{\label{structrtp__x__hdr_acbdc44c4b61dde5e00daf23fcf50066c}} 
uint16\+\_\+t {\bfseries length}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/rtp.\+h\end{DoxyCompactItemize}
