\section{rtp\+\_\+hdr Struct Reference}
\label{structrtp__hdr}\index{rtp\+\_\+hdr@{rtp\+\_\+hdr}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structrtp__hdr_aa885f80060c8688c9a1af01f53e38a8f}} 
uint16\+\_\+t {\bfseries sequence}
\item 
\mbox{\label{structrtp__hdr_a542f3a11a8b84ec226b372881094fb60}} 
uint32\+\_\+t {\bfseries timestamp}
\item 
\mbox{\label{structrtp__hdr_a22e56432758066b9e7cd567189937789}} 
uint32\+\_\+t {\bfseries ssrc}
\item 
\mbox{\label{structrtp__hdr_abb3702967741d0bf8cad58a0fc6b0c2d}} 
uint8\+\_\+t {\bfseries data} [0]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/rtp.\+h\end{DoxyCompactItemize}
