\section{rtcp\+\_\+hdr Struct Reference}
\label{structrtcp__hdr}\index{rtcp\+\_\+hdr@{rtcp\+\_\+hdr}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structrtcp__hdr_a9d30cb444d699f9e1ba34f2097f98c8f}} 
uint8\+\_\+t {\bfseries byte0}
\item 
\mbox{\label{structrtcp__hdr_ad33487e2d4b04d22203523f424166d66}} 
uint8\+\_\+t {\bfseries type}
\item 
\mbox{\label{structrtcp__hdr_a81d21ccd495bbfa5bac3c162b53f2095}} 
uint16\+\_\+t {\bfseries length}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/rtp.\+h\end{DoxyCompactItemize}
