\section{osmux\+\_\+hdr Struct Reference}
\label{structosmux__hdr}\index{osmux\+\_\+hdr@{osmux\+\_\+hdr}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmux__hdr_a196aed00388a65b126a72a76680699b8}} 
uint8\+\_\+t {\bfseries seq}
\item 
\mbox{\label{structosmux__hdr_a281e689bfae94a2034769a96e48dc64b}} 
uint8\+\_\+t {\bfseries circuit\+\_\+id}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/\textbf{ osmux.\+h}\end{DoxyCompactItemize}
