\section{osmo\+\_\+rtp\+\_\+handle Struct Reference}
\label{structosmo__rtp__handle}\index{osmo\+\_\+rtp\+\_\+handle@{osmo\+\_\+rtp\+\_\+handle}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__rtp__handle_abf6fcec8a16ab321be06de61a2de9f10}} 
\begin{tabbing}
xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=\kill
struct \{\\
\>uint16\_t {\bfseries sequence}\\
\>uint32\_t {\bfseries timestamp}\\
\>uint32\_t {\bfseries ssrc}\\
\>struct timeval {\bfseries last\_tv}\\
\} {\bfseries tx}\\

\end{tabbing}\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
src/rtp.\+c\end{DoxyCompactItemize}
