\section{osmo\+\_\+rs232 Struct Reference}
\label{structosmo__rs232}\index{osmo\+\_\+rs232@{osmo\+\_\+rs232}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__rs232_a812a1e053b281246ec1fd42d61bda1bd}} 
struct osmo\+\_\+fd {\bfseries ofd}
\item 
\mbox{\label{structosmo__rs232_acd209ed3eded625ce61c7a84487cd3df}} 
struct llist\+\_\+head {\bfseries tx\+\_\+queue}
\item 
\mbox{\label{structosmo__rs232_a6a8ad53380b124dfa74ffa3b8f814514}} 
\begin{tabbing}
xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=\kill
struct \{\\
\>int($\ast$ {\bfseries read} )(struct \textbf{ osmo\_rs232} $\ast$)\\
\} {\bfseries cb}\\

\end{tabbing}\item 
\mbox{\label{structosmo__rs232_a807b616c3d96a2988a48cf46d023c058}} 
struct osmo\+\_\+timer\+\_\+list {\bfseries tx\+\_\+timer}
\item 
\mbox{\label{structosmo__rs232_a40ea1a7e7631b5b11222406773ac06a0}} 
\begin{tabbing}
xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=\kill
struct \{\\
\>char {\bfseries serial\_port} [PATH\_MAX]\\
\>int {\bfseries baudrate}\\
\>unsigned int {\bfseries delay\_us}\\
\} {\bfseries cfg}\\

\end{tabbing}\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
src/rs232.\+c\end{DoxyCompactItemize}
