\section{ipa\+\_\+head\+\_\+ext Struct Reference}
\label{structipa__head__ext}\index{ipa\+\_\+head\+\_\+ext@{ipa\+\_\+head\+\_\+ext}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structipa__head__ext_a625ac01b022643530d495a1fd661a4a4}} 
uint8\+\_\+t {\bfseries proto}
\item 
\mbox{\label{structipa__head__ext_ab32f6ef1a38d6d8fc23a2a57a17b376c}} 
uint8\+\_\+t {\bfseries data} [0]
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/ipa.\+h\end{DoxyCompactItemize}
