\section{baudrate2termbits Struct Reference}
\label{structbaudrate2termbits}\index{baudrate2termbits@{baudrate2termbits}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structbaudrate2termbits_aca5e0bd4d1bb8ca39005d057c98f4ed1}} 
int {\bfseries rate}
\item 
\mbox{\label{structbaudrate2termbits_a65bafeff4b6ee135e73ec863bd13d2ae}} 
int {\bfseries def}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
src/rs232.\+c\end{DoxyCompactItemize}
