\section{osmo\+\_\+iqbal\+\_\+opts Struct Reference}
\label{structosmo__iqbal__opts}\index{osmo\+\_\+iqbal\+\_\+opts@{osmo\+\_\+iqbal\+\_\+opts}}


Processing options for the IQ balance optimization algorithm.  




{\ttfamily \#include $<$iqbal.\+h$>$}

\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__iqbal__opts_a76e529e63af98a524caa8cf61c4de828}} 
int \textbf{ fft\+\_\+size}
\begin{DoxyCompactList}\small\item\em F\+FT size to use. \end{DoxyCompactList}\item 
\mbox{\label{structosmo__iqbal__opts_abb7854c9f674bf12022ce0b5485fd2a7}} 
int \textbf{ fft\+\_\+count}
\begin{DoxyCompactList}\small\item\em Number of F\+FT to use. \end{DoxyCompactList}\item 
\mbox{\label{structosmo__iqbal__opts_ac6dc907d8a810172970426cac913f2b0}} 
int \textbf{ max\+\_\+iter}
\begin{DoxyCompactList}\small\item\em Max \# iterations per pass. \end{DoxyCompactList}\item 
\mbox{\label{structosmo__iqbal__opts_ad36e80298fe63cb9f985401e30f768fc}} 
int \textbf{ start\+\_\+at\+\_\+prev}
\begin{DoxyCompactList}\small\item\em Use prev values as starting point. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Processing options for the IQ balance optimization algorithm. 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/dsp/\textbf{ iqbal.\+h}\end{DoxyCompactItemize}
