\doxysection{include/osmocom/vty Directory Reference}
\label{dir_ad0987c3a4469d30f90ad6a86b791ce3}\index{include/osmocom/vty Directory Reference@{include/osmocom/vty Directory Reference}}
\doxysubsection*{Files}
\begin{DoxyCompactItemize}
\item 
file \textbf{ buffer.\+h}
\begin{DoxyCompactList}\small\item\em Buffering to output and input. \end{DoxyCompactList}\item 
file \textbf{ command.\+h}
\begin{DoxyCompactList}\small\item\em Zebra configuration command interface routine. \end{DoxyCompactList}\item 
file \textbf{ cpu\+\_\+sched\+\_\+vty.\+h}
\begin{DoxyCompactList}\small\item\em API to CPU / Threading / Scheduler properties from VTY configuration. \end{DoxyCompactList}\item 
file \textbf{ logging.\+h}
\item 
file \textbf{ misc.\+h}
\item 
file \textbf{ ports.\+h}
\begin{DoxyCompactList}\small\item\em TCP port numbers used for VTY interfaces in osmocom projects. \end{DoxyCompactList}\item 
file \textbf{ stats.\+h}
\item 
file \textbf{ tdef\+\_\+vty.\+h}
\begin{DoxyCompactList}\small\item\em API to configure \textbf{ osmo\+\_\+tdef} Tnnn timers from VTY configuration. \end{DoxyCompactList}\item 
file \textbf{ telnet\+\_\+interface.\+h}
\begin{DoxyCompactList}\small\item\em minimalistic telnet/network interface it might turn into a wire interface \end{DoxyCompactList}\item 
file \textbf{ vector.\+h}
\begin{DoxyCompactList}\small\item\em Generic vector interface header. \end{DoxyCompactList}\item 
file \textbf{ vty.\+h}
\end{DoxyCompactItemize}
