\doxysection{osmo\+\_\+cbsp\+\_\+keep\+\_\+alive Struct Reference}
\label{structosmo__cbsp__keep__alive}\index{osmo\_cbsp\_keep\_alive@{osmo\_cbsp\_keep\_alive}}


{\ttfamily \#include $<$cbsp.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
uint8\+\_\+t \textbf{ repetition\+\_\+period}
\end{DoxyCompactItemize}


\doxysubsection{Field Documentation}
\mbox{\label{structosmo__cbsp__keep__alive_a08d0f4148e84103de03938a79a6be582}} 
\index{osmo\_cbsp\_keep\_alive@{osmo\_cbsp\_keep\_alive}!repetition\_period@{repetition\_period}}
\index{repetition\_period@{repetition\_period}!osmo\_cbsp\_keep\_alive@{osmo\_cbsp\_keep\_alive}}
\doxysubsubsection{repetition\_period}
{\footnotesize\ttfamily uint8\+\_\+t osmo\+\_\+cbsp\+\_\+keep\+\_\+alive\+::repetition\+\_\+period}



Referenced by \textbf{ cbsp\+\_\+dec\+\_\+keep\+\_\+alive()}, and \textbf{ cbsp\+\_\+enc\+\_\+keep\+\_\+alive()}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/gsm/\textbf{ cbsp.\+h}\end{DoxyCompactItemize}
