\doxysection{lapdm\+\_\+msg\+\_\+ctx Struct Reference}
\label{structlapdm__msg__ctx}\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}


LAPDm message context.  




{\ttfamily \#include $<$lapdm.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
struct \textbf{ lapdm\+\_\+datalink} $\ast$ \textbf{ dl}
\item 
int \textbf{ lapdm\+\_\+fmt}
\item 
uint8\+\_\+t \textbf{ chan\+\_\+nr}
\item 
uint8\+\_\+t \textbf{ link\+\_\+id}
\item 
uint8\+\_\+t \textbf{ ta\+\_\+ind}
\item 
uint8\+\_\+t \textbf{ tx\+\_\+power\+\_\+ind}
\item 
uint32\+\_\+t \textbf{ fn}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
LAPDm message context. 

\doxysubsection{Field Documentation}
\mbox{\label{structlapdm__msg__ctx_afccf21d63bb868ef93f117e815fa017a}} 
\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}!chan\_nr@{chan\_nr}}
\index{chan\_nr@{chan\_nr}!lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}
\doxysubsubsection{chan\_nr}
{\footnotesize\ttfamily uint8\+\_\+t lapdm\+\_\+msg\+\_\+ctx\+::chan\+\_\+nr}



Referenced by \textbf{ l2\+\_\+ph\+\_\+data\+\_\+ind()}, \textbf{ lapdm\+\_\+send\+\_\+ph\+\_\+data\+\_\+req()}, \textbf{ rsl\+\_\+rll\+\_\+error()}, \textbf{ send\+\_\+rll\+\_\+simple()}, \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3()}, \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3\+\_\+ui()}, and \textbf{ set\+\_\+lapdm\+\_\+context()}.

\mbox{\label{structlapdm__msg__ctx_ac0428ddfae44a993faf3a97150994889}} 
\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}!dl@{dl}}
\index{dl@{dl}!lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}
\doxysubsubsection{dl}
{\footnotesize\ttfamily struct \textbf{ lapdm\+\_\+datalink}$\ast$ lapdm\+\_\+msg\+\_\+ctx\+::dl}



Referenced by \textbf{ l2\+\_\+ph\+\_\+data\+\_\+ind()}, \textbf{ lapdm\+\_\+send\+\_\+ph\+\_\+data\+\_\+req()}, \textbf{ rsl\+\_\+rll\+\_\+error()}, \textbf{ send\+\_\+rll\+\_\+simple()}, \textbf{ send\+\_\+rslms\+\_\+dlsap()}, \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3()}, \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3\+\_\+ui()}, and \textbf{ set\+\_\+lapdm\+\_\+context()}.

\mbox{\label{structlapdm__msg__ctx_aec7de8b7a9e412862f8cd066300de702}} 
\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}!fn@{fn}}
\index{fn@{fn}!lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}
\doxysubsubsection{fn}
{\footnotesize\ttfamily uint32\+\_\+t lapdm\+\_\+msg\+\_\+ctx\+::fn}



Referenced by \textbf{ l2\+\_\+ph\+\_\+data\+\_\+ind()}.

\mbox{\label{structlapdm__msg__ctx_a706984528b2e015f3e961b62540e63d1}} 
\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}!lapdm\_fmt@{lapdm\_fmt}}
\index{lapdm\_fmt@{lapdm\_fmt}!lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}
\doxysubsubsection{lapdm\_fmt}
{\footnotesize\ttfamily int lapdm\+\_\+msg\+\_\+ctx\+::lapdm\+\_\+fmt}



Referenced by \textbf{ l2\+\_\+ph\+\_\+data\+\_\+ind()}, and \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3\+\_\+ui()}.

\mbox{\label{structlapdm__msg__ctx_a84e102efa76b0ae10f4e4dedee836369}} 
\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}!link\_id@{link\_id}}
\index{link\_id@{link\_id}!lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}
\doxysubsubsection{link\_id}
{\footnotesize\ttfamily uint8\+\_\+t lapdm\+\_\+msg\+\_\+ctx\+::link\+\_\+id}



Referenced by \textbf{ l2\+\_\+ph\+\_\+data\+\_\+ind()}, \textbf{ lapdm\+\_\+send\+\_\+ph\+\_\+data\+\_\+req()}, \textbf{ rsl\+\_\+rll\+\_\+error()}, \textbf{ send\+\_\+rll\+\_\+simple()}, \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3()}, \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3\+\_\+ui()}, and \textbf{ set\+\_\+lapdm\+\_\+context()}.

\mbox{\label{structlapdm__msg__ctx_ab14c18c9c4ee247cb3c758c284f91670}} 
\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}!ta\_ind@{ta\_ind}}
\index{ta\_ind@{ta\_ind}!lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}
\doxysubsubsection{ta\_ind}
{\footnotesize\ttfamily uint8\+\_\+t lapdm\+\_\+msg\+\_\+ctx\+::ta\+\_\+ind}



Referenced by \textbf{ l2\+\_\+ph\+\_\+data\+\_\+ind()}, and \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3\+\_\+ui()}.

\mbox{\label{structlapdm__msg__ctx_a7b2ff6be134b7cf835e0e55acf3c6e63}} 
\index{lapdm\_msg\_ctx@{lapdm\_msg\_ctx}!tx\_power\_ind@{tx\_power\_ind}}
\index{tx\_power\_ind@{tx\_power\_ind}!lapdm\_msg\_ctx@{lapdm\_msg\_ctx}}
\doxysubsubsection{tx\_power\_ind}
{\footnotesize\ttfamily uint8\+\_\+t lapdm\+\_\+msg\+\_\+ctx\+::tx\+\_\+power\+\_\+ind}



Referenced by \textbf{ l2\+\_\+ph\+\_\+data\+\_\+ind()}, and \textbf{ send\+\_\+rslms\+\_\+rll\+\_\+l3\+\_\+ui()}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/gsm/\textbf{ lapdm.\+h}\end{DoxyCompactItemize}
