\doxysection{ipac\+\_\+preproc\+\_\+pc\+\_\+thresh Struct Reference}
\label{structipac__preproc__pc__thresh}\index{ipac\_preproc\_pc\_thresh@{ipac\_preproc\_pc\_thresh}}


MS/\+BS Power Control Thresholds (RSL\+\_\+\+IPAC\+\_\+\+EIE\+\_\+\+MS\+\_\+\+PWR\+\_\+\+CTL)  




{\ttfamily \#include $<$gsm\+\_\+08\+\_\+58.\+h$>$}



\doxysubsection{Detailed Description}
MS/\+BS Power Control Thresholds (RSL\+\_\+\+IPAC\+\_\+\+EIE\+\_\+\+MS\+\_\+\+PWR\+\_\+\+CTL) 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/gsm/protocol/\textbf{ gsm\+\_\+08\+\_\+58.\+h}\end{DoxyCompactItemize}
