\doxysection{ipac\+\_\+preproc\+\_\+pc\+\_\+comp\+\_\+field Struct Reference}
\label{structipac__preproc__pc__comp__field}\index{ipac\_preproc\_pc\_comp\_field@{ipac\_preproc\_pc\_comp\_field}}


Osmocom extension for\+: PC Threshold Comparators (RSL\+\_\+\+IPAC\+\_\+\+EIE\+\_\+\+OSMO\+\_\+\+PC\+\_\+\+THRESH\+\_\+\+COMP)  




{\ttfamily \#include $<$gsm\+\_\+08\+\_\+58.\+h$>$}



\doxysubsection{Detailed Description}
Osmocom extension for\+: PC Threshold Comparators (RSL\+\_\+\+IPAC\+\_\+\+EIE\+\_\+\+OSMO\+\_\+\+PC\+\_\+\+THRESH\+\_\+\+COMP) 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/gsm/protocol/\textbf{ gsm\+\_\+08\+\_\+58.\+h}\end{DoxyCompactItemize}
