\doxysection{gsm0808\+\_\+circuit\+\_\+pool\+\_\+list Struct Reference}
\label{structgsm0808__circuit__pool__list}\index{gsm0808\_circuit\_pool\_list@{gsm0808\_circuit\_pool\_list}}


{\ttfamily \#include $<$gsm0808\+\_\+utils.\+h$>$}

\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
uint8\+\_\+t \textbf{ pool} [\textbf{ CIRCUIT\+\_\+\+POOL\+\_\+\+LIST\+\_\+\+MAXLEN}]
\item 
unsigned int \textbf{ list\+\_\+len}
\end{DoxyCompactItemize}


\doxysubsection{Field Documentation}
\mbox{\label{structgsm0808__circuit__pool__list_aef71a69d8f39c242e2efae40d5511301}} 
\index{gsm0808\_circuit\_pool\_list@{gsm0808\_circuit\_pool\_list}!list\_len@{list\_len}}
\index{list\_len@{list\_len}!gsm0808\_circuit\_pool\_list@{gsm0808\_circuit\_pool\_list}}
\doxysubsubsection{list\_len}
{\footnotesize\ttfamily unsigned int gsm0808\+\_\+circuit\+\_\+pool\+\_\+list\+::list\+\_\+len}

\mbox{\label{structgsm0808__circuit__pool__list_a6bf0fc5391a4fc777f806082037e231b}} 
\index{gsm0808\_circuit\_pool\_list@{gsm0808\_circuit\_pool\_list}!pool@{pool}}
\index{pool@{pool}!gsm0808\_circuit\_pool\_list@{gsm0808\_circuit\_pool\_list}}
\doxysubsubsection{pool}
{\footnotesize\ttfamily uint8\+\_\+t gsm0808\+\_\+circuit\+\_\+pool\+\_\+list\+::pool[\textbf{ CIRCUIT\+\_\+\+POOL\+\_\+\+LIST\+\_\+\+MAXLEN}]}



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/gsm/\textbf{ gsm0808\+\_\+utils.\+h}\end{DoxyCompactItemize}
