\doxysection{include/osmocom/core/crcgen.h File Reference}
\label{crcgen_8h}\index{include/osmocom/core/crcgen.h@{include/osmocom/core/crcgen.h}}


Osmocom generic CRC routines global header.  


{\ttfamily \#include $<$osmocom/core/crc8gen.\+h$>$}\newline
{\ttfamily \#include $<$osmocom/core/crc16gen.\+h$>$}\newline
{\ttfamily \#include $<$osmocom/core/crc32gen.\+h$>$}\newline
{\ttfamily \#include $<$osmocom/core/crc64gen.\+h$>$}\newline


\doxysubsection{Detailed Description}
Osmocom generic CRC routines global header. 

